
\begin{figure}
\beginpicture
\setcoordinatesystem units <1mm,1mm>
\put {~} at -27 0
\tickstovaluesleading10pt
\longticklength4pt
\shortticklength2pt
\setplotarea x from 0 to 90, y from 0 to 60

\axis bottom
        label {$M_\mathrm{n} / \unitfrac{g}{mol}$}
        ticks in withvalues $10^3$ $10^5$ $10^7$ /
        quantity 3 short quantity 5
        /
\axis left
        label {{\it W}(log {\it M})}
        ticks in %withvalues $10^4$ $10^5$ $10^6$ /
       quantity 3 short quantity 5
        /
\axis top
        ticks in quantity 3 short quantity 5
        /
\axis right
        ticks in quantity 3 short quantity 5
        /

\inboundscheckon
\setquadratic

\plot
55.55	0.00	
55.49	0.10	
55.42	0.12	
55.37	0.15	
55.31	0.17	
55.24	0.19	
55.19	0.23	
55.13	0.28	
55.06	0.32	
54.99	0.36	
54.95	0.40	
54.88	0.47	
54.81	0.54	
54.77	0.61	
54.70	0.68	
54.63	0.75	
54.56	0.86	
54.52	0.97	
54.45	1.07	
54.38	1.18	
54.34	1.29	
54.27	1.45	
54.20	1.61	
54.16	1.77	
54.09	1.92	
54.02	2.08	
53.96	2.30	
53.91	2.53	
53.84	2.75	
53.78	2.97	
53.73	3.19	
53.66	3.49	
53.60	3.79	
53.55	4.09	
53.48	4.39	
53.42	4.69	
53.35	5.08	
53.30	5.47	
53.24	5.86	
53.17	6.25	
53.12	6.64	
53.06	7.13	
52.99	7.63	
52.94	8.12	
52.88	8.62	
52.81	9.11	
52.74	9.71	
52.70	10.32	
52.63	10.92	
52.56	11.53	
52.52	12.13	
52.45	12.85	
52.38	13.56	
52.34	14.28	
52.27	14.99	
52.20	15.71	
52.16	16.51	
52.09	17.33	
52.02	18.14	
51.95	18.96	
51.91	19.78	
51.84	20.66	
51.77	21.55	
51.73	22.44	
51.66	23.33	
51.59	24.23	
51.55	25.15	
51.48	26.09	
51.41	27.02	
51.37	27.95	
51.30	28.88	
51.23	29.82	
51.19	30.73	
51.12	31.67	
51.05	32.59	
51.01	33.53	
50.94	34.39	
50.87	35.27	
50.81	36.14	
50.76	37.01	
50.69	37.88	
50.63	38.63	
50.58	39.40	
50.51	40.15	
50.45	40.91	
50.40	41.66	
50.33	42.25	
50.27	42.85	
50.22	43.45	
50.15	44.04	
50.09	44.64	
50.04	45.01	
49.97	45.40	
49.91	45.79	
49.86	46.18	
49.79	46.56	
49.73	46.72	
49.68	46.88	
49.61	47.04	
49.55	47.18	
49.50	47.35	
49.43	47.27	
49.37	47.18	
49.32	47.11	
49.25	47.03	
49.19	46.96	
49.14	46.64	
49.07	46.34	
49.01	46.04	
48.96	45.74	
48.89	45.44	
48.83	44.95	
48.78	44.46	
48.71	43.97	
48.65	43.48	
48.60	43.00	
48.53	42.36	
48.47	41.74	
48.42	41.10	
48.35	40.48	
48.29	39.84	
48.24	39.12	
48.17	38.40	
48.11	37.69	
48.06	36.97	
47.99	36.25	
47.93	35.50	
47.88	34.75	
47.81	34.01	
47.75	33.25	
47.70	32.50	
47.63	31.76	
47.59	31.03	
47.52	30.29	
47.45	29.56	
47.41	28.82	
47.34	28.13	
47.27	27.44	
47.23	26.76	
47.16	26.08	
47.09	25.39	
47.05	24.78	
46.98	24.18	
46.91	23.57	
46.87	22.96	
46.80	22.34	
46.73	21.83	
46.69	21.30	
46.62	20.78	
46.55	20.27	
46.51	19.74	
46.44	19.31	
46.40	18.88	
46.33	18.44	
46.26	18.01	
46.22	17.58	
46.15	17.23	
46.08	16.88	
46.04	16.55	
45.97	16.19	
45.90	15.85	
45.86	15.58	
45.79	15.30	
45.72	15.02	
45.68	14.75	
45.61	14.47	
45.54	14.27	
45.50	14.05	
45.43	13.84	
45.38	13.62	
45.32	13.40	
45.25	13.24	
45.20	13.07	
45.14	12.90	
45.07	12.73	
45.02	12.56	
44.96	12.43	
44.89	12.30	
44.84	12.17	
44.78	12.04	
44.73	11.91	
44.66	11.79	
44.60	11.69	
44.55	11.58	
44.48	11.47	
44.42	11.36	
44.37	11.27	
44.30	11.18	
44.24	11.08	
44.19	10.99	
44.12	10.90	
44.08	10.82	
44.01	10.73	
43.94	10.65	
43.90	10.57	
43.83	10.48	
43.76	10.41	
43.72	10.33	
43.65	10.25	
43.61	10.18	
43.54	10.10	
43.47	10.02	
43.43	9.95	
43.36	9.88	
43.29	9.80	
43.25	9.73	
43.18	9.65	
43.13	9.58	
43.07	9.51	
43.00	9.43	
42.95	9.36	
42.89	9.29	
42.82	9.21	
42.77	9.14	
42.71	9.07	
42.66	9.00	
42.59	8.92	
42.53	8.85	
42.48	8.77	
42.41	8.70	
42.35	8.63	
42.30	8.55	
42.23	8.48	
42.19	8.40	
42.12	8.33	
42.05	8.26	
42.01	8.18	
41.94	8.11	
41.87	8.03	
41.83	7.96	
41.76	7.88	
41.72	7.81	
41.65	7.73	
41.58	7.65	
41.54	7.58	
41.47	7.50	
41.42	7.43	
41.36	7.35	
41.29	7.27	
41.24	7.19	
41.18	7.12	
41.11	7.04	
41.06	6.96	
41.00	6.88	
40.95	6.81	
40.88	6.73	
40.82	6.65	
40.77	6.57	
40.70	6.49	
40.66	6.41	
40.59	6.34	
40.52	6.26	
40.48	6.18	
40.41	6.10	
40.37	6.03	
40.30	5.95	
40.23	5.87	
40.19	5.80	
40.12	5.73	
40.05	5.65	
40.01	5.57	
39.94	5.50	
39.89	5.43	
39.83	5.36	
39.76	5.28	
39.71	5.21	
39.65	5.14	
39.60	5.08	
39.53	5.01	
39.47	4.94	
39.42	4.87	
39.35	4.81	
39.31	4.74	
39.24	4.68	
39.17	4.61	
39.13	4.55	
39.06	4.49	
39.02	4.43	
38.95	4.36	
38.88	4.30	
38.84	4.24	
38.77	4.18	
38.72	4.13	
38.66	4.07	
38.59	4.01	
38.54	3.95	
38.48	3.90	
38.43	3.84	
38.36	3.79	
38.30	3.73	
38.25	3.68	
38.18	3.63	
38.14	3.57	
38.07	3.52	
38.00	3.47	
37.96	3.42	
37.89	3.37	
37.85	3.32	
37.78	3.27	
37.71	3.22	
37.67	3.17	
37.60	3.13	
37.55	3.08	
37.49	3.04	
37.42	2.99	
37.37	2.95	
37.31	2.90	
37.26	2.86	
37.19	2.82	
37.13	2.78	
37.08	2.74	
37.01	2.70	
36.97	2.66	
36.90	2.63	
36.83	2.59	
36.79	2.55	
36.72	2.52	
36.68	2.48	
36.61	2.45	
36.54	2.41	
36.50	2.38	
36.43	2.35	
36.38	2.31	
36.32	2.28	
36.25	2.25	
36.20	2.22	
36.14	2.19	
36.09	2.16	
36.02	2.13	
35.96	2.10	
35.91	2.08	
35.84	2.05	
35.80	2.02	
35.73	2.00	
35.69	1.97	
35.62	1.95	
35.55	1.92	
35.51	1.90	
35.44	1.88	
35.39	1.85	
35.33	1.83	
35.26	1.81	
35.21	1.79	
35.15	1.77	
35.10	1.75	
35.03	1.73	
34.97	1.71	
34.92	1.69	
34.85	1.67	
34.81	1.65	
34.74	1.63	
34.70	1.62	
34.63	1.60	
34.56	1.59	
34.52	1.57	
34.45	1.55	
34.40	1.54	
34.34	1.52	
34.27	1.51	
34.22	1.49	
34.16	1.48	
34.11	1.46	
34.04	1.45	
34.00	1.43	
33.93	1.42	
33.86	1.40	
33.82	1.39	
33.75	1.37	
33.71	1.36	
33.64	1.34	
33.57	1.33	
33.53	1.31	
33.46	1.29	
33.41	1.28	
33.35	1.26	
33.30	1.24	
33.23	1.23	
33.17	1.21	
33.12	1.19	
33.05	1.17	
33.01	1.16	
32.94	1.14	
32.87	1.12	
32.83	1.10	
32.76	1.08	
32.72	1.06	
32.65	1.05	
32.60	1.03	
32.54	1.01	
32.47	0.99	
32.42	0.97	
32.36	0.96	
32.31	0.94	
32.24	0.92	
32.20	0.90	
32.13	0.89	
32.06	0.87	
32.02	0.86	
31.95	0.84	
31.91	0.82	
31.84	0.81	
31.77	0.79	
31.73	0.78	
31.66	0.76	
31.61	0.75	
31.55	0.73	
31.50	0.72	
31.43	0.70	
31.37	0.69	
31.32	0.67	
31.25	0.66	
31.21	0.64	
31.14	0.63	
31.10	0.61	
31.03	0.60	
30.96	0.58	
30.92	0.57	
30.85	0.55	
30.80	0.54	
30.74	0.52	
30.69	0.51	
30.62	0.49	
30.56	0.48	
30.51	0.46	
30.44	0.44	
30.40	0.43	
30.33	0.41	
30.29	0.39	
30.22	0.38	
30.15	0.36	
30.11	0.34	
30.04	0.32	
29.99	0.31	
29.93	0.29	
29.86	0.27	
29.75	0.23	
29.70	0.21	
29.63	0.20	
29.59	0.18	
29.52	0.16	
29.45	0.14	
29.41	0.13	
29.34	0.11	
/

\setdashpattern <1mm,1mm,1mm,1mm>
\plot
0.00	0.00	
0.93	0.00	
3.96	0.00	
4.59	0.00	
5.19	0.00	
6.27	0.01	
6.77	0.01	
7.25	0.01	
8.14	0.01	
8.95	0.01	
9.71	0.01	
10.40	0.01	
11.06	0.01	
11.67	0.02	
12.24	0.02	
13.05	0.02	
13.79	0.03	
14.48	0.03	
15.12	0.03	
15.92	0.04	
16.48	0.04	
17.18	0.05	
17.83	0.06	
18.59	0.07	
19.29	0.08	
19.95	0.09	
20.68	0.10	
21.36	0.12	
22.00	0.14	
22.69	0.16	
23.43	0.18	
24.12	0.21	
24.84	0.24	
25.50	0.28	
26.20	0.32	
26.85	0.36	
27.57	0.42	
28.24	0.48	
28.93	0.55	
29.61	0.63	
30.29	0.72	
31.01	0.83	
31.69	0.95	
32.38	1.09	
33.07	1.25	
33.74	1.42	
34.43	1.63	
35.12	1.86	
35.80	2.12	
36.50	2.43	
37.18	2.78	
37.87	3.20	
38.55	3.70	
39.25	4.27	
39.93	4.92	
40.62	5.69	
41.30	6.52	
41.99	7.48	
42.67	8.56	
43.37	9.87	
44.05	11.39	
44.73	13.22	
45.42	15.41	
46.11	18.19	
46.80	21.79	
47.48	26.33	
48.17	32.60	
48.86	55.25	
49.54	49.50	
50.23	0.00	
50.92	0.00	
51.60	0.00	
52.29	0.14	
52.97	0.28	
53.66	0.29	
54.34	0.21	
55.03	0.13	
55.72	0.06	
56.41	0.00	
57.09	0.12	
57.78	0.00	
58.46	0.00	
59.15	0.00	
59.84	0.00	
60.52	0.00		
/

\endpicture

\caption{Vergleich 
eines typischen {\footnotesize GPC}-Spektrums mit der entsprechenden 
theoretischen Funktion. 
}

\end{figure}
