
\begin{figure}
\beginpicture
\setcoordinatesystem units <1mm,1mm>
\put {~} at -27 0
\tickstovaluesleading10pt
\longticklength4pt
\shortticklength2pt
\setplotarea x from 0 to 90, y from 0 to 60

\axis bottom
        label {$M_\mathrm{n} / \unitfrac{g}{mol}$}
        ticks in withvalues $10^3$ $10^5$ $10^7$ /
        quantity 3 short quantity 5
        /
\axis left
        label {{\it W}(log {\it M})}
        ticks in %withvalues $10^4$ $10^5$ $10^6$ /
       quantity 3 short quantity 5
        /
\axis top
        ticks in quantity 3 short quantity 5
        /
\axis right
        ticks in quantity 3 short quantity 5
        /

\inboundscheckon

\plot
50.40	0.00	
50.36	0.12	
50.29	0.14	
50.24	0.15	
50.20	0.17	
50.15	0.18	
50.09	0.20	
50.04	0.22	
50.00	0.24	
49.95	0.26	
49.88	0.28	
49.84	0.30	
49.79	0.32	
49.75	0.34	
49.70	0.36	
49.64	0.38	
49.59	0.40	
49.55	0.43	
49.50	0.45	
49.43	0.47	
49.39	0.49	
49.34	0.51	
49.30	0.54	
49.25	0.56	
49.19	0.58	
49.14	0.60	
49.10	0.62	
49.05	0.65	
48.98	0.67	
48.94	0.69	
48.89	0.71	
48.85	0.73	
48.80	0.75	
48.74	0.77	
48.69	0.79	
48.65	0.81	
48.60	0.83	
48.53	0.85	
48.49	0.87	
48.44	0.88	
48.40	0.90	
48.35	0.92	
48.29	0.94	
48.24	0.96	
48.20	0.98	
48.15	1.00	
48.11	1.02	
48.04	1.04	
47.99	1.05	
47.95	1.07	
47.90	1.09	
47.84	1.11	
47.79	1.13	
47.75	1.15	
47.70	1.17	
47.66	1.19	
47.59	1.22	
47.54	1.24	
47.50	1.26	
47.45	1.28	
47.41	1.30	
47.34	1.33	
47.30	1.35	
47.25	1.38	
47.21	1.40	
47.14	1.42	
47.09	1.45	
47.05	1.48	
47.00	1.50	
46.96	1.53	
46.89	1.56	
46.85	1.59	
46.80	1.61	
46.76	1.65	
46.71	1.68	
46.64	1.71	
46.60	1.75	
46.55	1.78	
46.51	1.81	
46.46	1.86	
46.40	1.90	
46.35	1.94	
46.31	1.98	
46.26	2.02	
46.22	2.07	
46.15	2.12	
46.10	2.18	
46.06	2.23	
46.01	2.29	
45.97	2.34	
45.90	2.40	
45.86	2.48	
45.81	2.55	
45.77	2.63	
45.72	2.70	
45.65	2.78	
45.61	2.86	
45.56	2.96	
45.52	3.07	
45.47	3.17	
45.41	3.28	
45.36	3.38	
45.32	3.49	
45.27	3.63	
45.23	3.78	
45.16	3.92	
45.11	4.07	
45.07	4.22	
45.02	4.36	
44.98	4.57	
44.91	4.77	
44.87	4.97	
44.82	5.18	
44.78	5.38	
44.73	5.58	
44.66	5.86	
44.62	6.13	
44.57	6.41	
44.53	6.69	
44.48	6.96	
44.42	7.24	
44.37	7.61	
44.33	7.98	
44.28	8.35	
44.24	8.72	
44.17	9.09	
44.12	9.46	
44.08	9.95	
44.03	10.43	
43.99	10.92	
43.92	11.40	
43.88	11.89	
43.83	12.37	
43.79	12.99	
43.74	13.60	
43.70	14.21	
43.63	14.83	
43.58	15.45	
43.54	16.07	
43.49	16.81	
43.45	17.56	
43.38	18.32	
43.34	19.07	
43.29	19.83	
43.25	20.58	
43.20	21.46	
43.13	22.34	
43.09	23.22	
43.04	24.10	
43.00	25.00	
42.95	25.87	
42.89	26.85	
42.84	27.84	
42.80	28.82	
42.75	29.80	
42.71	30.79	
42.66	31.77	
42.59	32.81	
42.55	33.83	
42.50	34.87	
42.46	35.91	
42.41	36.95	
42.35	37.97	
42.30	38.99	
42.26	40.00	
42.21	41.02	
42.17	42.02	
42.12	43.02	
42.05	44.04	
42.01	44.93	
41.96	45.84	
41.92	46.75	
41.87	47.65	
41.81	48.53	
41.76	49.43	
41.72	50.15	
41.67	50.82	
41.63	51.53	
41.58	52.22	
41.51	52.92	
41.47	53.63	
41.42	54.03	
41.38	54.44	
41.33	54.87	
41.27	55.25	
41.22	55.67	
41.18	56.08	
41.13	56.15	
41.09	56.23	
41.04	56.32	
40.97	56.35	
40.93	56.43	
40.88	56.53	
40.84	56.22	
40.79	55.94	
40.73	55.66	
40.68	55.37	
40.64	55.09	
40.59	54.79	
40.55	54.19	
40.50	53.59	
40.43	52.97	
40.39	52.35	
40.34	51.75	
40.30	51.13	
40.25	50.25	
40.21	49.39	
40.14	48.52	
40.10	47.65	
40.05	46.77	
40.01	45.90	
39.96	44.86	
39.92	43.81	
39.85	42.77	
39.80	41.74	
39.76	40.70	
39.71	39.67	
39.67	38.57	
39.60	37.47	
39.56	36.36	
39.51	35.26	
39.47	34.16	
39.42	33.07	
39.38	32.00	
39.31	30.93	
39.26	29.87	
39.22	28.80	
39.17	27.73	
39.13	26.67	
39.08	25.72	
39.02	24.76	
38.97	23.81	
38.93	22.84	
38.88	21.89	
38.84	20.94	
38.79	20.12	
38.72	19.33	
38.68	18.53	
38.63	17.72	
38.59	16.92	
38.54	16.13	
38.50	15.49	
38.43	14.85	
38.39	14.21	
38.34	13.59	
38.30	12.95	
38.25	12.32	
38.21	11.84	
38.14	11.37	
38.09	10.90	
38.05	10.42	
38.00	9.94	
37.96	9.47	
37.91	9.13	
37.85	8.79	
37.80	8.45	
37.76	8.11	
37.71	7.77	
37.67	7.44	
37.62	7.20	
37.55	6.97	
37.51	6.74	
37.46	6.50	
37.42	6.26	
37.37	6.03	
37.33	5.88	
37.26	5.72	
37.22	5.56	
37.17	5.40	
37.13	5.24	
37.08	5.08	
37.04	4.97	
36.97	4.86	
36.92	4.76	
36.88	4.65	
36.83	4.54	
36.79	4.43	
36.74	4.36	
36.68	4.28	
36.63	4.20	
36.59	4.13	
36.54	4.05	
36.50	3.98	
36.45	3.92	
36.41	3.86	
36.34	3.81	
36.29	3.75	
36.25	3.69	
36.20	3.64	
36.16	3.59	
36.11	3.55	
36.05	3.50	
36.00	3.46	
35.96	3.42	
35.91	3.37	
35.87	3.33	
35.82	3.30	
35.75	3.26	
35.71	3.22	
35.66	3.19	
35.62	3.15	
35.57	3.12	
35.53	3.09	
35.46	3.06	
35.42	3.02	
35.37	2.99	
35.33	2.96	
35.28	2.93	
35.24	2.91	
35.19	2.88	
35.12	2.85	
35.08	2.82	
35.03	2.80	
34.99	2.77	
34.94	2.75	
34.90	2.72	
34.83	2.70	
34.79	2.67	
34.74	2.65	
34.70	2.62	
34.65	2.60	
34.61	2.58	
34.56	2.56	
34.49	2.54	
34.45	2.51	
34.40	2.49	
34.36	2.47	
34.31	2.45	
34.27	2.43	
34.20	2.41	
34.16	2.39	
34.11	2.37	
34.07	2.35	
34.02	2.33	
33.98	2.31	
33.93	2.29	
33.86	2.27	
33.82	2.25	
33.77	2.24	
33.73	2.22	
33.68	2.20	
33.64	2.18	
33.57	2.16	
33.53	2.15	
33.48	2.13	
33.44	2.11	
33.39	2.10	
33.35	2.08	
33.30	2.06	
33.23	2.05	
33.19	2.03	
33.14	2.01	
33.10	2.00	
33.05	1.98	
33.01	1.97	
32.94	1.95	
32.90	1.94	
32.85	1.92	
32.81	1.91	
32.76	1.89	
32.72	1.88	
32.67	1.86	
32.60	1.84	
32.56	1.83	
32.51	1.81	
32.47	1.80	
32.42	1.78	
32.38	1.77	
32.33	1.75	
32.27	1.74	
32.22	1.72	
32.18	1.71	
32.13	1.69	
32.09	1.68	
32.04	1.66	
31.97	1.64	
31.93	1.63	
31.88	1.61	
31.84	1.59	
31.79	1.58	
31.75	1.56	
31.70	1.54	
31.64	1.53	
31.59	1.51	
31.55	1.49	
31.50	1.48	
31.46	1.46	
31.41	1.44	
31.37	1.42	
31.30	1.41	
31.25	1.39	
31.21	1.37	
31.16	1.36	
31.12	1.34	
31.07	1.32	
31.03	1.30	
30.96	1.29	
30.92	1.27	
30.87	1.25	
30.83	1.24	
30.78	1.22	
30.74	1.20	
30.69	1.18	
30.62	1.17	
30.58	1.15	
30.53	1.14	
30.49	1.12	
30.44	1.10	
30.40	1.09	
30.35	1.07	
30.29	1.06	
30.24	1.04	
30.20	1.02	
30.15	1.01	
30.11	0.99	
30.06	0.98	
30.02	0.96	
29.95	0.95	
29.90	0.93	
29.86	0.92	
29.81	0.90	
29.77	0.89	
29.72	0.87	
29.66	0.86	
29.61	0.84	
29.57	0.83	
29.52	0.81	
29.48	0.80	
29.43	0.78	
29.39	0.77	
29.32	0.75	
29.27	0.74	
29.23	0.72	
29.18	0.71	
29.14	0.69	
29.09	0.68	
29.05	0.66	
28.98	0.65	
28.94	0.63	
28.89	0.62	
28.85	0.60	
28.80	0.59	
28.76	0.57	
28.71	0.56	
28.64	0.54	
28.60	0.53	
28.55	0.52	
28.51	0.50	
28.46	0.49	
28.42	0.47	
28.37	0.46	
28.31	0.44	
28.26	0.43	
28.22	0.42	
28.17	0.40	
28.13	0.39	
28.08	0.38	
28.04	0.36	
27.99	0.35	
27.92	0.33	
27.88	0.32	
27.83	0.31	
27.79	0.29	
27.74	0.28	
27.70	0.27	
27.65	0.25	
27.59	0.24	
27.54	0.23	
27.50	0.21	
27.45	0.20	
27.41	0.19	
27.36	0.17	
27.32	0.16	
27.25	0.15	
27.20	0.13	
27.16	0.12	
27.11	0.11	
27.07	0.10	
27.02	0.09	
/

%\setquadratic
\setdashpattern <1mm,1mm,1mm,1mm>
\plot
0.00	0.00	
0.93	0.00	
1.78	0.00	
2.56	0.00	
3.29	0.01	
3.96	0.01	
4.59	0.01	
5.19	0.01	
5.74	0.01	
6.27	0.01	
7.25	0.01	
7.70	0.01	
8.55	0.01	
8.95	0.02	
9.71	0.02	
10.40	0.02	
11.06	0.02	
11.67	0.03	
12.52	0.03	
13.05	0.04	
13.79	0.04	
14.48	0.05	
15.12	0.06	
15.73	0.06	
16.30	0.07	
17.01	0.08	
17.67	0.09	
18.29	0.11	
19.01	0.12	
19.56	0.14	
20.32	0.16	
20.91	0.18	
21.58	0.21	
22.20	0.24	
22.88	0.27	
23.52	0.31	
24.20	0.36	
24.84	0.40	
25.50	0.46	
26.13	0.53	
26.78	0.60	
27.45	0.69	
28.08	0.79	
28.72	0.90	
29.37	1.03	
30.03	1.19	
30.68	1.35	
31.34	1.55	
31.99	1.78	
32.63	2.05	
33.30	2.37	
33.96	2.75	
34.60	3.18	
35.23	3.66	
35.90	4.26	
36.55	4.92	
37.20	5.67	
37.85	6.54	
38.50	7.52	
39.14	8.70	
39.79	10.26	
40.44	12.73	
41.09	15.92	
41.74	55.12	
42.38	57.00	
43.04	55.85	
43.68	1.95	
44.33	0.06	
44.99	0.02	
45.63	0.00	
46.28	0.00	
46.94	0.00	
47.59	0.00	
/

\endpicture

\caption{Vergleich 
eines typischen {\footnotesize GPC}-Spektrums (durchgezogende Linie) mit der entsprechenden 
theoretischen Funktion (gestrichelte Linie). 
}

\end{figure}
