
\begin{figure}
\beginpicture
\setcoordinatesystem units <1mm,1mm>
\put {~} at -37 0
\tickstovaluesleading10pt
\longticklength4pt
\shortticklength2pt
\setplotarea x from 0 to 90, y from 0 to 60

\axis bottom
        label {$M_\mathrm{n} / \unitfrac{g}{mol}$}
        ticks in withvalues $10^{3}$ $10^5$ $10^{7}$ /
        quantity 3 short quantity 5
        /
\axis left
        label {{\it W}(log {\it M})}
        ticks in %withvalues $10^(3.5)$ $10^5$ $10^{6.5}$ /
       quantity 3 short quantity 5
        /
\axis top
        ticks in quantity 3 short quantity 5
        /
\axis right
        ticks in quantity 3 short quantity 5
        /

\inboundscheckon
\setquadratic
%\setdashpattern <3mm,1mm,0.5mm,1mm>
\plot
69.84	0.00	
69.77	0.13	
69.68	0.15	
69.62	0.18	
69.53	0.20	
69.46	0.23	
69.37	0.26	
69.28	0.29	
69.21	0.32	
69.12	0.35	
69.05	0.38	
68.96	0.41	
68.87	0.44	
68.81	0.47	
68.72	0.50	
68.65	0.53	
68.56	0.57	
68.47	0.60	
68.40	0.64	
68.31	0.68	
68.24	0.73	
68.15	0.77	
68.06	0.83	
68.00	0.89	
67.91	0.94	
67.82	1.01	
67.75	1.08	
67.66	1.16	
67.59	1.24	
67.50	1.33	
67.41	1.42	
67.34	1.52	
67.25	1.62	
67.16	1.72	
67.10	1.84	
67.01	1.96	
66.92	2.08	
66.85	2.21	
66.76	2.34	
66.67	2.48	
66.60	2.63	
66.51	2.78	
66.42	2.94	
66.35	3.11	
66.26	3.29	
66.17	3.47	
66.11	3.68	
66.02	3.89	
65.93	4.09	
65.86	4.34	
65.77	4.58	
65.68	4.83	
65.59	5.12	
65.52	5.41	
65.43	5.70	
65.34	6.04	
65.27	6.37	
65.18	6.71	
65.09	7.11	
65.03	7.50	
64.94	7.89	
64.85	8.34	
64.76	8.78	
64.69	9.23	
64.60	9.74	
64.51	10.25	
64.42	10.75	
64.35	11.32	
64.26	11.88	
64.17	12.45	
64.10	13.08	
64.01	13.70	
63.92	14.33	
63.83	15.01	
63.77	15.69	
63.68	16.38	
63.59	17.12	
63.50	17.85	
63.43	18.59	
63.34	19.37	
63.25	20.16	
63.16	20.94	
63.07	21.77	
63.00	22.60	
62.91	23.43	
62.82	24.29	
62.73	25.15	
62.66	26.01	
62.57	26.89	
62.48	27.77	
62.39	28.65	
62.30	29.55	
62.24	30.45	
62.15	31.35	
62.06	32.22	
61.97	33.12	
61.90	33.99	
61.81	34.86	
61.72	35.76	
61.63	36.63	
61.54	37.44	
61.45	38.28	
61.38	39.12	
61.29	39.93	
61.20	40.72	
61.11	41.50	
61.02	42.22	
60.95	42.98	
60.86	43.67	
60.77	44.37	
60.68	45.04	
60.59	45.68	
60.50	46.28	
60.44	46.86	
60.35	47.44	
60.26	47.94	
60.17	48.43	
60.08	48.95	
59.99	49.36	
59.92	49.76	
59.83	50.20	
59.74	50.52	
59.65	50.84	
59.56	51.16	
59.47	51.39	
59.40	51.65	
59.31	51.88	
59.22	52.06	
59.13	52.20	
59.04	52.37	
58.95	52.43	
58.86	52.52	
58.77	52.61	
58.70	52.61	
58.61	52.64	
58.52	52.66	
58.43	52.61	
58.34	52.55	
58.25	52.49	
58.16	52.37	
58.07	52.26	
58.01	52.14	
57.92	51.97	
57.83	51.82	
57.74	51.65	
57.65	51.45	
57.56	51.24	
57.47	51.04	
57.38	50.78	
57.29	50.52	
57.22	50.29	
57.13	50.03	
57.04	49.74	
56.95	49.45	
56.86	49.13	
56.77	48.84	
56.68	48.52	
56.59	48.20	
56.50	47.85	
56.41	47.53	
56.32	47.18	
56.23	46.81	
56.16	46.49	
56.07	46.11	
55.98	45.76	
55.89	45.39	
55.80	44.98	
55.71	44.60	
55.62	44.23	
55.53	43.85	
55.44	43.44	
55.35	43.07	
55.26	42.69	
55.17	42.28	
55.08	41.88	
54.99	41.50	
54.90	41.09	
54.83	40.69	
54.74	40.31	
54.65	39.90	
54.56	39.53	
54.47	39.12	
54.38	38.72	
54.29	38.34	
54.20	37.93	
54.11	37.56	
54.02	37.18	
53.93	36.80	
53.84	36.42	
53.75	36.02	
53.66	35.67	
53.57	35.26	
53.48	34.92	
53.39	34.54	
53.30	34.16	
53.21	33.81	
53.12	33.44	
53.03	33.09	
52.94	32.71	
52.85	32.34	
52.76	31.99	
52.67	31.64	
52.58	31.29	
52.49	30.94	
52.40	30.57	
52.31	30.25	
52.22	29.90	
52.13	29.55	
52.04	29.23	
51.95	28.88	
51.86	28.56	
51.77	28.23	
51.68	27.91	
51.59	27.58	
51.50	27.27	
51.41	26.94	
51.32	26.62	
51.23	26.32	
51.14	26.01	
51.05	25.70	
50.96	25.40	
50.87	25.09	
50.78	24.79	
50.69	24.49	
50.60	24.18	
50.51	23.88	
50.42	23.59	
50.33	23.29	
50.24	23.00	
50.15	22.71	
50.06	22.42	
49.97	22.13	
49.88	21.85	
49.79	21.58	
49.70	21.29	
49.61	21.02	
49.52	20.75	
49.43	20.48	
49.34	20.21	
49.25	19.95	
49.16	19.69	
49.07	19.43	
48.98	19.17	
48.89	18.91	
48.80	18.66	
48.71	18.41	
48.62	18.15	
48.53	17.91	
48.44	17.66	
48.35	17.41	
48.26	17.17	
48.17	16.92	
48.08	16.68	
47.99	16.43	
47.90	16.20	
47.79	15.96	
47.70	15.72	
47.61	15.48	
47.52	15.25	
47.43	15.02	
47.34	14.79	
47.25	14.56	
47.16	14.34	
47.07	14.12	
46.98	13.90	
46.89	13.68	
46.80	13.47	
46.71	13.25	
46.62	13.05	
46.53	12.85	
46.44	12.64	
46.35	12.44	
46.26	12.25	
46.15	12.06	
46.06	11.87	
45.97	11.68	
45.88	11.49	
45.79	11.31	
45.70	11.14	
45.61	10.96	
45.52	10.79	
45.43	10.62	
45.34	10.45	
45.25	10.29	
45.16	10.13	
45.07	9.97	
44.98	9.81	
44.89	9.67	
44.78	9.51	
44.69	9.37	
44.60	9.22	
44.51	9.08	
44.42	8.94	
44.33	8.80	
44.24	8.66	
44.15	8.53	
44.06	8.39	
43.97	8.25	
43.88	8.12	
43.79	7.99	
43.67	7.86	
43.58	7.73	
43.49	7.60	
43.40	7.48	
43.31	7.35	
43.22	7.23	
43.13	7.11	
43.04	6.99	
42.95	6.88	
42.86	6.76	
42.77	6.66	
42.66	6.55	
42.57	6.44	
42.48	6.35	
42.39	6.25	
42.30	6.15	
42.21	6.06	
42.12	5.96	
42.03	5.87	
41.94	5.78	
41.85	5.69	
41.76	5.61	
41.65	5.52	
41.56	5.43	
41.47	5.34	
41.38	5.26	
41.29	5.17	
41.20	5.08	
41.11	5.00	
41.02	4.91	
40.93	4.83	
40.84	4.75	
40.73	4.66	
40.64	4.58	
40.55	4.51	
40.46	4.43	
40.37	4.35	
40.28	4.28	
40.19	4.21	
40.10	4.14	
40.01	4.07	
39.89	4.01	
39.80	3.94	
39.71	3.88	
39.62	3.83	
39.53	3.76	
39.44	3.71	
39.35	3.66	
39.26	3.60	
39.17	3.55	
39.06	3.50	
38.97	3.45	
38.88	3.39	
38.79	3.34	
38.70	3.29	
38.61	3.24	
38.52	3.19	
38.43	3.14	
38.34	3.09	
38.23	3.04	
38.14	2.99	
38.05	2.95	
37.96	2.90	
37.87	2.85	
37.78	2.81	
37.69	2.76	
37.60	2.72	
37.51	2.67	
37.40	2.63	
37.31	2.58	
37.22	2.54	
37.13	2.50	
37.04	2.45	
36.95	2.41	
36.86	2.37	
36.77	2.32	
36.65	2.28	
36.56	2.23	
36.47	2.19	
36.38	2.15	
36.29	2.10	
36.20	2.06	
36.11	2.02	
36.02	1.97	
35.93	1.93	
35.82	1.89	
35.73	1.85	
35.64	1.81	
35.55	1.78	
35.46	1.74	
35.37	1.71	
35.28	1.68	
35.19	1.64	
35.08	1.61	
34.99	1.58	
34.90	1.55	
34.81	1.52	
34.72	1.49	
34.63	1.46	
34.54	1.43	
34.45	1.40	
34.36	1.37	
34.25	1.34	
34.16	1.31	
34.07	1.29	
33.98	1.26	
33.89	1.23	
33.80	1.21	
33.71	1.18	
33.62	1.16	
33.50	1.13	
33.41	1.11	
33.32	1.09	
33.23	1.07	
33.14	1.05	
33.05	1.04	
32.96	1.02	
32.87	1.00	
32.76	0.99	
32.67	0.98	
32.58	0.96	
32.49	0.95	
32.40	0.94	
32.31	0.92	
32.22	0.91	
32.13	0.90	
32.04	0.88	
31.93	0.87	
31.84	0.85	
31.75	0.84	
31.66	0.82	
31.57	0.81	
31.48	0.79	
31.39	0.78	
31.30	0.76	
31.19	0.75	
31.10	0.73	
31.01	0.71	
30.92	0.70	
30.83	0.68	
30.74	0.67	
30.65	0.65	
30.56	0.63	
30.47	0.62	
30.35	0.60	
30.26	0.59	
30.17	0.57	
30.08	0.56	
29.99	0.54	
29.90	0.52	
29.81	0.51	
29.72	0.49	
29.63	0.48	
29.52	0.46	
29.43	0.45	
29.34	0.43	
29.25	0.42	
29.16	0.40	
29.07	0.38	
28.98	0.37	
28.89	0.35	
28.80	0.34	
28.69	0.32	
28.60	0.30	
28.51	0.29	
28.42	0.27	
28.33	0.26	
28.24	0.24	
28.15	0.22	
28.06	0.21	
27.97	0.19	
27.88	0.17	
27.77	0.15	
27.68	0.14		
27.50	0.10	
/

\setdashpattern <1mm,1mm,1mm,1mm>
\plot
0.00	0.00	
0.93	0.00	
1.78	0.00	
2.56	0.00	
3.29	0.01	
4.59	0.01	
5.19	0.01	
5.74	0.01	
6.77	0.01	
7.25	0.01	
8.14	0.01	
8.95	0.01	
9.71	0.01	
10.40	0.01	
11.37	0.01	
11.96	0.01	
12.78	0.01	
13.55	0.01	
14.48	0.02	
15.12	0.02	
15.92	0.02	
16.66	0.02	
17.34	0.02	
18.14	0.03	
19.01	0.03	
19.69	0.04	
20.44	0.04	
21.25	0.05	
22.00	0.06	
22.79	0.07	
23.52	0.08	
24.28	0.10	
24.99	0.11	
25.79	0.13	
26.53	0.16	
27.27	0.18	
28.02	0.21	
28.82	0.24	
29.56	0.28	
30.34	0.33	
31.05	0.39	
31.84	0.45	
32.60	0.52	
33.33	0.60	
34.11	0.70	
34.85	0.81	
35.62	0.94	
36.36	1.09	
37.11	1.26	
37.87	1.46	
38.63	1.69	
39.39	1.95	
40.14	2.25	
40.90	2.60	
41.65	2.99	
42.41	3.45	
43.17	3.97	
43.92	4.56	
44.67	5.23	
45.43	6.00	
46.19	6.88	
46.94	7.87	
47.70	9.01	
48.45	10.31	
49.21	11.79	
49.96	13.47	
50.72	15.42	
51.47	17.62	
52.23	20.18	
52.98	23.09	
53.74	26.42	
54.49	30.20	
55.25	34.39	
56.00	38.91	
56.75	43.54	
57.51	47.84	
58.27	51.12	
59.02	52.40	
59.78	50.52	
60.53	44.56	
61.29	34.67	
62.04	23.02	
62.80	12.69	
63.55	4.23	
64.31	0.00	
65.06	0.00	
65.81	0.00	
66.57	0.02	
67.32	0.01	
68.08	0.00	
71.57	0.21	
72.36	0.02	
73.15	0.04	
73.95	0.00	
74.74	0.00	
/

\endpicture

\caption{Vergleich 
eines typischen {\footnotesize GPC}-Spektrums (durchgezogende Linie) mit der entsprechenden 
theoretischen Funktion (gestrichelte Linie). 
}

\end{figure}
